1000 1200 1400 1600 1800 2000 3.4

3.45

3.5

3.55

3.6 a

Global ocean temperature ( °C)

1000 1200 1400 1600 1800 2000

0

2

4

6 c

Year

Depth (km)

-0.5 0 0.5